De: Roland Alexandru

Buna ziua am o problema cu soketul la placa de baza am niste pini indoiti as-i dori sa stiu daca puteti schimba soketul cu altul noi placa de baza este un

Intel Z390 AORUS Motherboard with 12 Phases IR Digital VRM, Fins-Array Heatsink, RGB Fusion 2.0, 802.11ac Wireless, Triple M.2 with Thermal Guards, ESS SABRE HIFI 9118, Intel® GbE LAN with cFosSpeed, Front & Rear USB 3.1 Gen 2 Type-C
Dual Channel Non-ECC Unbuffered DDR4, 4 DIMMs
Intel® Optane™ Memory Ready
12 Phases IR Digital VRM Solution with PowIRstage
Advanced Thermal Design with Fins-Array Heatsink and Direct Touch Heatpipe
Onboard Intel® CNVi 802.11ac 2×2 Wave 2 Wi-Fi
125dB SNR AMP-UP Audio with ALC1220 & High-End ESS SABRE 9118 DAC with WIMA audio capacitors
USB TurboCharger for Mobile Device Fast Charge Support
Intel® Gigabit LAN with cFosSpeed
RGB FUSION 2.0 with Multi-Zone Addressable LED Light Show Design, Supports Addressable LED & RGB LED Strips
Smart Fan 5 features Multiple Temperature Sensors and Hybrid Fan Headers with FAN STOP
Front USB 3.1 Gen 2 Type-C™ Header
Triple Ultra-Fast NVMe PCIe Gen3 x4 M.2 with Triple Thermal Guard
USB DAC-UP 2 with Adjustable Voltage
CEC 2019 Ready, Save Power With a Simple Click